0

0.1

0.2

0.3 (40-80%) ϕ (10-40%) ϕ (0-5%) ϕ

(GeV/c) T Transverse momentum p

0 1 2 3 4

0

0.1

0.2

0.3^S 0K Λ NQ=2 NQ=3 (0-80%) ϕ ϕ

2 Elliptic flow parameter v