y -6 -4 -2 0 2 4 6

dN/dy Λ net

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 peripheral (40%-100%) mid-central (20%-40%) central (0%-20%)