> 6 GeV/c) T (p AA R

0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 62.4 GeV ±π X-N. Wang : Parton Model 2/3 part

) ~ N AA I. Vitev : ln(R

/dy : 650-800 (Central Collisions) g dN

> 6 GeV/c) T (p AAR

0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 200 GeV ±π X-N. Wang : Parton Model 2/3 part

) ~ N AA I. Vitev : ln(R

/dy : 800-1175 (Central Collisions) g dN

partN

50 100 150 200 250 300 350

Ratio(62.4/200)

0.6 0.8 1.0 1.2 1.4 1.6