η_Δ

Δρ / Ρρ_{ref} (GeV/c)^2 ϕ_Δ

130 GeV, 76-92%

-2 -1 0 1 2

0 2 4 -0.001 0 0.001

0.002

0.003

0.004

0.005

0.006