R (fm)

1 2 3 4 5 6

(a) Mass and coupling constants from Table I a b c d

Pair Purity

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1

R (fm)

0 1 2 3 4 5 6 7

(b)