Q (GeV/c)

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2

C(Q)

0.8

1

1.2

1.4

1.6

1.8 2

2.2 Mass and coupling parameters from row (a) of Table I R = 6 fm R = 3 fm Mass and coupling parameters from row (d) of Table I R = 6 fm R = 3 fm