]^2

[GeV/c inv M 0.4 0.45 0.5 0.55 0.6 0

5000

10000

15000

20000

25000 Short 0K counts/2MeV

]^2

[GeV/c inv M 1.08 1.1 1.12 1.14 1.16 1.18 0

2000

4000

6000

8000

10000

12000 Λ Λ

counts/1MeV

]^2

[GeV/c inv M 1.25 1.3 1.35 1.4 1.45 0

50

100

150

200

250 300 Ξ Ξ counts/2MeV

]^2

[GeV/c inv M 1.6 1.65 1.7 1.75 1.8 0

10

20

30

40

50 Ω + Ω counts/3MeV