Ratio

-3 10

-2 10

-1 10

+π/^-π +/K^-K /pp -π/^-K -π/p Λ/Λ +π/Λ Λ/^-Ξ +π/^+Ξ -Ξ /2)/ + Ω+^-Ω(

Fitted

)σ Data - Fit (

-2 0 2 4