[GeV/c] Tp 1 2 3 4 5

Short 0 /2*K Λ+Λ

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 =200 GeV s STAR p+p =630GeV sp UA1 p+ PYTHIA 6.3 default PYTHIA 6.3 K=3