]^2

Mass [GeV/c

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

> [GeV/c] T<p

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0

1

-π^{s0}K_- K ρ^*K p ϕ Λ Λ -Ξ_+ Ξ -Ω

STAR p+p @ 200 GeV

STAR Central Au+Au @ 200 GeV

ISR Parameterization