(fm) 0 Im f

1 2 3

(fm) 0 Re f

-3

-2

-1 Λ + p -

Λ -p Corrected = 15% λ = 17.5% λ = 20% λ p p - Grach et al. Klempt et al. Pirner et al. Batty