ηΔ

0 0.2 0.4 0.6 0.8 1 1.2 1.4

(deg) ϕΔ

0 50 100 150

0

0.01

0.02

(a)

Unlike-sign signal fit

ηΔ

0 0.2 0.4 0.6 0.8 1 1.2 1.4

(deg) ϕΔ

0 50 100 150

0

0.01

0.02

(b)

Signal Unlike-sign