(GeV/c) Tp 0 2 4 6 8 10 ratio to FONLL

-110

1

10

p+p / FONLL (these data) STAR (PRL 94 (2005) 062301) PHENIX (PRL 97 (2006) 252002)

FONLL uncertainty FONLL c/(c+b) FONLL b/(c+b)