(GeV/c) Tp 0 2 4 6 8 10

-2 (GeV/c) η d_T N/dp 2 d_T pπ 1/2 ev 1/N

-12 10

-10 10

-8 10

-6 10

-4 10

-2 10

1 Au+Au 0-5% (x1000) Au+Au 10-40% (x100) Au+Au 40-80% (x10) d+Au p+p (right axis)

e → scaled FONLL D e → scaled FONLL B e → scaled FONLL (D+B)

)^3 c^{-2}

(mb GeV 3 /dp NSD p+pσ^3Ed

-10 10

-8 10

-6 10

-4 10

-2 10