/dy ch dN -100 0 100 200 300 400 500 600 700

resonance/non-resonance

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

p+p Au+Au

= 200 GeV

NNs x 2.9^-K*/K x 3.5 Λ*/Σ x 10.8 Λ*/Λ x 8.1

- /K ϕ

UrQMD

Thermal model