η 0 1 2 3 4 5 6

η/d_{ch} dN

0 100 200 300 400 500 600 700 800 200 GeV PHOBOS 130 GeV PHOBOS 62.4 GeV STAR 19.6 GeV PHOBOS

))δ/_0η -η

C/(1+ exp(