50 100 150 200 250 300

2.8 3 3.2 3.4 3.6 3.8

0-5%
10-20%
20-30%
30-40%
40-50%
50-60%

η dN_{ch} / dη

50 100 150 200 250 300

2.4 2.6 2.8 3 3.2 3.4 3.6

0-5%
10-20%
20-30%
30-40%
40-50%
50-60%

η dN_γ / dη