beam - y η -14 -12 -10 -8 -6 -4 -2 0 2 4 part

) /( 0.5 N ) η (dN/d

0 0.5 1 1.5 2 2.5 3 3.5 130 GeV (0-3 fm) 62.4 GeV (0-3 fm) 19.6 GeV (0-3 fm)

AMPT