0 0.5 1 1.5 2 2.5 3 3.5

-1.5 -1.25 -1 -0.75 -0.5 -0.25 0

0-5% 62.4 GeV (STAR)
40-50% 62.4 GeV (STAR)
pp 200 GeV (UA5)

-pp 53 GeV (ISR)

η - y_{beam}

(dN_{ch} / dη) / (0.5 N_{part})

0 0.5 1 1.5 2 2.5 3 3.5

-2 -1.5 -1 -0.5

0-5% 62.4 GeV (STAR)
40-50% 62.4 GeV (STAR)

γ 540 GeV (pp UA5) -

η - y_{beam}

(dN_γ / dη) / (0.5 N_{part})