0

1

2

3

4

5

50 100 150 200 250

Ch : η = 3.0 (PHOBOS)
Ch : η = 3.0 (BRAHMS)
Ch : η = 3.0 (STAR)

γ : η = 3.0 (STAR)

Ch : η = 0.0 (RHIC)

      Ch : η = 3.0 (QCD model)

      Ch : η = 0.0 (QCD model)

s^{1/2}(GeV)

(dN / dη) / (0.5 N_{part})