beam

(or y) - y η -5 -4 -3 -2 -1 0

(%) 1v

-6 -5 -4 -3 -2 -1 0 1 2 = 0 CMy

= 62.4 GeV NNs STAR:

= 200 GeV NNs STAR:

= 17.2 GeV NNs NA49: