1 0.5 1 E866 E895

NA44 NA49

WA97 WA98

CERES PHOBOS PHENIX

STAR STAR

4

6

4

6

4

6

4

6

4

6

4

6

1 1

1.5

(GeV) NNs λ (fm) oR (fm) sR (fm) l R s / R oR