(GeV/c) Tp 0 1 2 3 4 5 6 7 8 9 10

R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 =200 GeV NNs

neutral pions

- dAu min. bias (PbGl) dAR - dAu min. bias (PbSc) dAR - AuAu 0-10% central AAR