1.275 1.3 1.325 1.35 1.375 0

10000

20000

30000 + Ξ + ^-Ξ

(a)

1.625 1.65 1.675 1.7 1.725 0

200

400

600

800 + Ω + ^-Ω

(b)

0 20 40 60 80 0 2000

4000

6000

8000

10000

12000

+ Ξ + ^-Ξ

(c)

0 20 40 60 80 0

100

200

300

400

+ Ω + ^-Ω

(d)

)^2

(GeV/c inv Invariant mass m

(degree) Ψ-ϕ Azimuthal angle

Counts (arb. units) Counts (arb. units)