0 200 400 600 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 | < 2.14 π-ϕΔ| 4<p^{trig}<6 GeV/c 6<p^{trig}<10 GeV/c inclusive

<p > (GeV/c)

η/d ch dN