(GeV/c) Tp 0 1 2 3 4

Nucl. Mod. Factor

-1 10

1

0-10%/p+p AA R^*K

0-10%/50%-80% CP R^*K

0-5%/60%-80% CP R^0_SK

0-5%/60%-80% CP RΛ