λ Fixed λ Variable

λ

0.35

0.4

)^2 (fm 2 oR

22 24 26 28

)^2 (fm 2 sR

18

20

)^2 (fm 2 lR

30

32

34

)^2 (fm 2 osR

-2

0

2

λ

0.5

)^2 (fm 2 oR

16

18

)^2 (fm 2 sR

14 15 16

)^2 (fm 2 lR

16

17

18

)^2 (fm 2 osR

-2 0

2

0 /2π π 0 /2π π

20-30%

< 0.25 T 0.15 < k

10-20%

< 0.60 T 0.35 < k

(radians) Φ