0 0.005

0.01

0.015

0.02

0.025

0 0.005

0.01

0.015

0.02

0.025

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 0.005

0.01

0.015

0.02

0.025

p (GeV/c)

T / p T pδ (rad) ϕδ (rad) θδ