R’ (fm)

1 2 3 4 5 6 7 8 9 10

1 2 3 4 5 6 7 8 9 10

o Parameters for R s Parameters for R l Parameters for R

0 50 100 150 200 250 300 350 400

α

0.2 0.3 0.4 0.5 0.6

0.2 0.3 0.4 0.5 0.6

participants N