2

4

6

2

4

0-30% STAR

-π^-π STAR

+π^+π PHENIX

-π^-π PHENIX

+π^+π

2

4

6

0.2 0.4 0.6 0.8 1 1.2 2

4

6

0.2 0.4 0.6 0.8 1 1.2 0.8

1 1.1

(GeV/c) Tk (GeV/c) Tk

(fm) oR

(fm) sR

(fm) lR

s / R oR