2v STAR 2 / v PHOBOS 2v

(GeV/c) tp

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 PHOBOS Data STAR Data

0 0.5 1 1.5 2 2.5 3 3.5 4 0.7 0.8 0.9 1 1.1 1.2