0

0.1

(a) 30-70% (b) 5-30%

±π_0 SK p Λ+Λ

(c) 0-5%

0 0.5 1 1.5 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

0 0.5 1 1.5 0 0.5 1 1.5

/n_2v Ratio

/n (GeV/c) tp