(GeV/c) tp 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

(%) 2v

0 2 4 6 8 10 12 14

2 MC simulated v including FTPC mom. res. 2 MC v

20-70% {4} 2 TPC+FTPC v 20-70% {2} 2 FTPC v