〉 )) _iϕ - _{tp}ϕ cos(2( Σ〈

-110

Au+Au 60%-20% dAu top 20% dAu 40%-20% dAu 100%-40% pp

(GeV/c) tp 0 2 4 6 8 10 12

ratio

0

0.5

1

1.5

2

2.5 pp top 20%

pp 40%-20%

pp 100%-40%