2v STAR 2 / v PHENIX 2v

(GeV/c) tp

0

0.05

0.1 Pions Kaons Protons

Open: STAR Data

Closed: PHENIX Data

0 0.5 1 1.5 0.6 0.8 1 1.2 1.4