Asymmetry ratio η

0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

a)

|<1.0) η 0-20% (0.5<| |<1.0) η 20-40% (0.5<| |<1.0) η 40-100% (0.5<|

|<1.0) η Sat. 0-20% (0.5<| |<1.0) η Sat. 20-40% (0.5<| |<1.0) η Sat. 40-100% (0.5<|

(GeV/c) Tp 1 2 3 4 5 6 7 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

b)

|<0.5) η 0-20% (0.0<| |<0.5) η 20-40% (0.0<| |<0.5) η 40-100% (0.0<|

|<0.5) η Sat. 0-20% (0.0<| |<0.5) η Sat. 20-40% (0.0<| |<0.5) η Sat. 40-100% (0.0<|