(GeV/c) Tp 2 4 6 8

]^{-2} [(GeV/c) ηd_T N/dp 2 )d_Tpπ

1/(2

-8 10

-6 10

-4 10

-2 10

1

210 <-0.5 η -1.0<

< 0.0 η -0.5<

< 0.5 η 0.0<

< 1.0 η 0.5<

0-20% x 35 20-40% x 20 0-100% x 8 40-100% x 20 0-20% / 2 20-40% / 4 0-100% / 9 40-100% / 17