part N 0 50 100 150 200 250 300 350 400

(GeV)

〉η/d_{ch} dN〈 /〉η/d_TdE〈

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

STAR PHENIX WA98 HIJING

part N 0 50 100 150 200 250 300 350 400 0.4

0.5

0.6

(GeV/c)

〉 _Tp〈