0 50 100 150 200 250 300 350 400

) (GeV)

part

/ (0.5 N

〉η/d_TdE〈

0

1

2

3

4

5

6_{= 200 GeV)} NN s STAR (Au+Au - = 130 GeV) NN s PHENIX (Au+Au - = 17.5 GeV) NN s WA98 (Pb+Pb - EKRT model HIJING Two component model

part N 0 50 100 150 200 250 300 350 400 2

4

6