p (GeV/c)

0 0.5 1 1.5 2 2.5 3 dep energy (GeV)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Experimental -K_+ K_- π_+ π p p Average