0.14 0.16 0.18 0.2 0.22 0.24 0.26 0

0.005

0.01

0.015

0.02

0.025

0.03

, GeV ee Pair Invariant Mass M

, mb/MeV ee / dM σd

Differential Cross-section vs. Pair Invariant Mass

-e^+

STAR e EPA Calculation (a) QED Calculation