part N 0 50 100 150 200 250 300 350 400

|<1) (NN) η (|ηd_T N/dp 2d |<1) η (|ηd_T N/dp 2 ) d part

(2/N

0 1 2 3 4 5 = 2.05 GeV/c Tp

(GeV/c) Tp 0 1 2 3 4 5 6

|<1) η (|ν

0.4 0.6 0.8 1 1.2 1.4 1.6

Participant scaling

Binary Collision scaling