0.5 1 1.5 0-5% 5-10%

0.5 1 1.5 10-20% 30-40%

-1 -0.5 0 0.5 1 0 0.5 1 1.5 40-60%

η -1 -0.5 0 0.5 1

60-80%

>2 GeV/c) (NN)

T (p η dN/d

>2 GeV/c) T (p η ) dN/d bin (1/N