(GeV/c) Tp 0 1 2 3 4 5 6

]^{-2} |<1) [(GeV/c) η (0.5<| ηd_T

N/dp 2 ) d_Tpπ

(1/2

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

10^3

0-5% 5-10% / 5 10-20% / 10 20-30% / 15 30-40% / 20 40-60% / 25 60-80% / 30

|<1 η )/2 0.5<| -+h + (h = 130 GeV NNs Au+Au,