part N 0 50 100 150 200 250 300 350 400

part

Ratio of N

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 HIJING / Glauber VENUS / Glauber

binN

0 100 200 300 400 500 600 700 800 900 1000 1100

bin Ratio of N

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8