0.5 1 1.5 2 = 0.2 GeV/c cut Tp = 1.0 GeV/c cut Tp

0 100 200 300 0 0.5 1 1.5 2 = 2.0 GeV/c cut Tp

part N 0 100 200 300

= 3.8 GeV/c cut Tp

|<1) η F(|