(GeV/c) tp 0 0.5 1 1.5 2 2.5

)^2c^{-2} dy) (GeV t /(dp γN^2

) d_t N) 1/(p π 1/(2

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

10^3

10^4

10^5

x8 x4 x2

350 500 650 800

/dy γ 1/(N) dN

100 200 300 400 500

100 125 150 175 200

y -0.5 0 0.5 35 50 65 80 95

0-11% 0-11%, r>40cm

11-34% 11-34%, r>40cm

34-85% 34-85%, r>40cm

0-85% 0-85%, r>40cm