100 80 60 40

1) 200 GeV 2) 62.4 GeV 3) 54.4 GeV

100 80 60 40

4) 39 GeV 5) 27 GeV 6) 19.6 GeV

100 80 60 40 0 100 200 300

7) 14.5 GeV

0 100 200 300

8) 11.5 GeV

0 100 200 300

9) 7.7 GeV

〉 _{part} N〈 Averaged Number of Participant Nucleons

Detector Efficiency x Acceptance (%)

Au+Au Collisions at RHIC

< 2.0 (GeV/c) T |y| < 0.5, 0.4 < p

proton anti-proton

< 0.8 (GeV/c) T 0.4 < p < 2.0 (GeV/c) T 0.8 < p