θ cos 1− 0.8− 0.6− 0.4− 0.2− 0 0.2 0.4 0.6 0.8 1

[a.u.] raw ψJ/N

0.2

0.4

0.6 STAR < 1 GeV/c ψJ/ T 0 < p

ϕ 0 0.5 1 1.5 2 2.5 3

[a.u.] raw ψJ/N

0.05

0.1

0.15

0.2 raw signal ε× scaled A

Collins-Soper Frame

1− 0.5− 0 0.5 1

[a.u.]

corrected

ψJ/N

0

0.1

0.2

0.3

/ndf = 21.1 / 15 2χ 0.73 ± = -0.51 θλ 0.06 ± = 0.09 ϕλ 0 0.5 1 1.5 2 2.5 3

[a.u.]

corrected

ψJ/N

0

0.05

0.1

corrected signal simultaneous fit θ cos ϕ