Fri Jul 3 01:53:51 2020

)^2

(GeV/c μμ m 2.6 2.8 3 3.2 3.4 3.6 3.8

)^2 Counts/(0.04 GeV/c

1000

2000

3000

4000

5000

6000_{= 200 GeV} s p+p , |y| < 0.5

-μ^+μ →ψJ/ < 10 GeV/c T 0 < p 153 ± = 11773 ψJ/N

STAR Data fit signal background